Introduction to NCache – An In-Memory Distributed Datastore

NCache is an open-source, in-memory distributed cache that accelerates the performance of .NET and Java applications by caching frequently accessed data, ensuring fast transactional speeds and linear scalability. Its distributed architecture allows seamless scaling by adding more nodes, automatically balancing the load, and providing consistent performance as traffic and data volume increases. Unlike other caching…

The post Introduction to NCache – An In-Memory Distributed Datastore appeared first on NCache.